Calculations of the Reflection Probability

Coulomb interaction between two ions by Monte-Carlo method input: q, T_‖, T_⊥, Q_x, Q_y, C/N

sensitivity of calculations:

to transverse ion temperature is little (factor of 100) to longitudinal ion temperature is moderate (factor of 5)

R.W. Hasse Phys. Rev. Lett. 83, 3430 (1999)