Typical Beam Parameters for Cooled Highly Charged Ions

phase space density ∝ N^{−0.5} ⇒ increase with decreasing ion number

cooling rate decreases for intense ion beams

IBS theoretically: δpp , ϵ⊥ ∝ (q 2 A )^{13}