Properties of Cooled Decelerated Ions

experimental equilibrium values: ϵ ∝ (Nq^2/A)^{0.4−0.5}, τ^{0.4−0.5}_{ec} , (βγ)^{−4/3} δp/p ∝ (Nq^2/A)^{0.2−0.3}, τ^{0.2−0.3}_{ec} , (βγ)^{−2/3}