Modes of Operation

1) storage mode (constant beam energy) a) stochastic cooling b) electron cooling c) beam accumulation d) experiments with stored beam (electron cooler, gas jet target, SMS) e) reinjection

2) deceleration/acceleration

a) electron cooling at various energies b) (ultra)slow extraction

3) isochronous mode

(mass measurements with TOF method)